R_c Measurements (Summer-2001)

ALEPH Lepton ALEPH c-counting DELPHI c-counting OPAL c-counting ALEPH D* incl/excl DELPHI D* incl/excl OPAL D* incl/excl ALEPH D excl/excl SLD Multi-tag World Average

0.1675Α0.0062Α0.0103 0.1738Α0.0047Α0.0113 0.1692Α0.0047Α0.0097 0.167 Α0.011 Α0.012 0.166 Α0.012 Α0.009 0.161 Α0.010 Α0.009 0.180 Α0.010 Α0.012 0.173 Α0.014 Α0.009 0.1738Α0.0031Α0.0021 0.1719Α0.0031 SM

0.14 0.15 0.16 0.17 0.18 0.19 0.2