δsin^2θ_W ζ_b

After Takeuchi, Grant, and Rosner:

Winter-2001

(0,0) determined by m_t=174, m_H=300, α_s=0.119 α_{EM}=1/128.905

SLD A_b

LEP A_{FB}^b SLD A_{LR} + LEP A_l

Standard Model: 169Λm_tΛ179 100Λm_HΛ1000

Zbb^- Parity Violation

-0.1

-0.08

-0.06

-0.04

-0.02

0

0.02

0.04

0.06

0.08

0.1

-0.003 -0.002 -0.001 0 0.001 0.002 0.003