VXD Offline Flow Chart for VXRECEX

Constraintrack to IP with max area?

NoYes Constraintrack to IP, no max area?

NoLoop over CDC tracks

Call VXDXTR toextrapolate track and errorsto all vxd layers

Call VXDXTIP to gettrack parameters and errorsat all vxd layers

Call VXDXTRF to gettrack parameters and errorsat all vxd layers

Yes Requireminimum search area?

NoYesCall VXADPMN

Call VXTKPTH todetermine which ccds areinside primary error ellipse

More CDC tracks?

NoExitYes DoesTrack have a good link?

YesNo